Conicmeter^∗

Dr. Sameen Ahmed Khan (rohelakhan@yahoo.com) Assistant Professor of Physics Engineering Department Salalah College of Technology (SCOT), http://www.sct.edu.om/ Post Box No. 608, Postal Code: 211 Salalah, Sultanate of Oman. Fax: +968-23226267

http://www.geocities.com/rohelakhan/ http://rohelakhan.googlepages.com/ http://www.imsc.res.in/∼jagan/

Conicmeter

Conicmeter is the instrument devised to ... .

• Sameen Ahmed Khan,

Conicmeter, (patent in process, http://www.geocities.com/rohelakhan/conicmeter.html).

∗Updated on Friday the 24 October 2008